00 05 10 15 20 25 30 35 40 45 50 55

00 05 10 15 20 25 30 35 40 45 50 55

00 05 10 15 20 25 30 35 40 45 50 55

00 05 10 15 20 25 30 35 40 45 50 55

00 05 10 15 20 25 30 35 40 45 50 55

Tiempo (s)

Acel. Max. 0.9 Int JMA: 1

Acel. Max. 0.9 Int JMA: 1

Acel. Max. 0.8 Int JMA: 1

Acel. Max. 0.6 Int JMA: 1

Acel. Max. 0.0 Int JMA: 0

Hosp C. Neily

Est Bio Osa Verde, Osa

Bomberos C. Neily

La Palma, Osa

La Sabana